%
% Tutorial for GNUPLOT plotting program, for LaTeX users
% David Kotz (David.Kotz@Dartmouth.edu)
% Duke University Computer Science Department
%
% NOTE: If LaTeX runs out of memory processing plots,
% add ``with lines 4'' to each curve in eg*.plt and rerun make.
%

% some header info
\input{header}

\begin{document}

\title{\LaTeX\ and the GNUPLOT Plotting
Program\thanks{This document describes GNUPLOT version 3.0. All plots
in this document were made with that version of GNUPLOT.} }
\author{David Kotz \\ \verb+David.Kotz@Dartmouth.edu+}
\date{July 3, 1991}

\maketitle

\pagestyle{myheadings}
\markright{GNUPLOT \LaTeX\ Tutorial Version 3.0}

\currentspace % defined in header.tex

\section{Introduction and History}

GNUPLOT was originally developed by Colin Kelley and Thomas Williams
in 1986 to plot functions and data files on a variety of terminals.
In 1988 and 1989 I created an alternate version, known as Gnu\TeX,
that supported a new ``terminal type'' called {\tt latex}, so gnuplot
would output \LaTeX\ code. The plot could then be included in a
\LaTeX\ document. I added a number of embellishments, supported only
by the {\tt latex} terminal, allowing the user to produce
publication-quality plots.

In late 1989 and early 1990 Gnu\TeX\ and a number of other GNUPLOT
variants were merged together into a new release of GNUPLOT, 2.0. This
includes, among many other improvements, a \LaTeX\ driver derived from
the one in Gnu\TeX. Former Gnu\TeX\ users are referred to
Section~\ref{oldusers} for information about adapting to GNUPLOT.
Anyone interested in using GNUPLOT with \LaTeX\ should read the next
section, a tutorial, and the primary GNUPLOT manual.

The reader should note that the \LaTeX\ picture environments output by
GNUPLOT can be quite large and complicated, and can easily exceed the
memory capacity of \TeX. If an enlarged version of \TeX\ is available,
it is wise to use it. Otherwise, keep your plots simple and add
\verb+\clearpage+ to your document where necessary.

There is also a new EEPIC driver ({\tt eepic}), intended for use with
the EEPIC macro package for \LaTeX. EEPIC allows for much more
efficient line-drawing, runs through \LaTeX\ faster, and uses less
memory.  See Section~\ref{s:eepic} for more information.

There is a small package of auxiliary files (makefiles and scripts)
that I find useful for making \LaTeX\ plots with GNUPLOT. This is
available for \verb+ftp+ as \verb+pub/gnuplot-latex.shar+ from
\verb+cs.duke.edu+. I can mail copies (see the end of this paper for
information).

\section{Using GNUPLOT for \LaTeX: a Tutorial}

GNUPLOT is by nature an interactive program. Users making plots for
\LaTeX\ will generally not use GNUPLOT interactively.  Whenever hard
copy is desired from GNUPLOT, the program need not be run on a
graphics terminal. In this case the output is directed to a file or
pipe, then sent to the appropriate output device. For example, output
from the terminal type {\tt unixplot} may be sent to a program
interpreting the Unix plotting standard. The terminal types {\tt
imagen} and {\tt postscript} may be used for output to printers
understanding those languages. (A shell script ({\tt lasergnu}) is
supplied with the distribution that will accept a GNUPLOT command or
input file and send the output to an Imagen or Postscript laser
printer. This script may have been adapted to your site.) The terminal
type {\tt fig} outputs FIG code that can be read by the Fig graphics
program and translated into forms usable in both \TeX\ and
\LaTeX\ documents.

We now ignore the interactive nature of GNUPLOT and provide the input
to GNUPLOT from a file, \ie,
\begin{verbatim}
      gnuplot gnu.input
\end{verbatim}
In this example, all of the commands to GNUPLOT are contained in the
file {\tt gnu.input}. Multiple filenames may be supplied to GNUPLOT
this way, read in the order they are given.  The output (one or more
plots) may be piped to another program or redirected to a file.
Usually, however, we direct the output explicitly with an instruction
to GNUPLOT (the {\tt set output} command). GNUPLOT continues to print
error messages to the terminal (stderr).

\paragraph{Example 1:} Here is a first example, producing a plot for
this document. The GNUPLOT input file is given below, and the output
appears as Figure~\ref{eg1}. The input file defines the output to be
in \LaTeX, gives a file name for the output, and plots $y=sin(x)$ for
$x$ on $[-\pi,\pi]$. To produce the figure, I simply
\verb+\input{eg1}+ in a {\tt center} environment in a {\tt figure}
environment. In following examples, I will enclose the figure in a box
to make it look a little better.

\singlespace
\begin{verbatim}
    set terminal latex
    set output "eg1.tex"
    plot [-3.14:3.14] sin(x)
\end{verbatim}
\currentspace

\begin{figure}[htbp]
  \begin{center}
    \input{eg1}
  \end{center}
  \caption{A first example: $y=sin(x)$}
  \label{eg1}
\end{figure}

Note that GNUPLOT has drawn in the axes, labeled the tic marks for us,
scaled the $y$ axis automatically, and added a key in the
upper-right-hand corner (this may be moved with the {\tt set key}
command, and removed with {\tt set nokey}).

This is the default line style for the \LaTeX\ driver.  Because of the
limited picture capabilities of \LaTeX, many dots are required to
approximate drawing a solid line. This may overload the memory of many
\TeX\ implementations. There are other line types available that draw
dotted lines and use much less memory. The EEPIC driver draws solid
lines with much less memory usage.

\paragraph{Example 2:} Now we will embellish the plot a little with
some labels.  This input file produces Figure~\ref{eg2}.

\singlespace
\begin{verbatim}
    set terminal latex
    set output "eg2.tex"
    set size 5/5., 4/3.
    set format xy "$%g$"
    set title "This is a plot of $y=sin(x)$"
    set xlabel "This is the $x$ axis"
    set ylabel "This is\\the\\$y$ axis"
    plot [0:6.28] [0:1] sin(x)
\end{verbatim}
\currentspace

\boxfigure{htbp}{\fullboxwidth}{
  \begin{center}
    \input{eg2}
  \end{center}
  \caption{A more fancy example.}
  \label{eg2}
}

We have specified the plot to be 5 inches wide and 4 inches tall with
the {\tt set size} command. This is the size of the area used by the
plot, {\em including} space for the labels.  In the first example,
this size was the default 5 inches by 3 inches. By specifying the
scaling factors of 1 (or 5/5) and 1.3333 (or 4/3), we obtain the
desired plot size.

We have requested that the format used by the $x$- and $y$-axis tic
mark labels be in \LaTeX\ math mode. This makes the labels look a
little better. The default is \verb+set format xy "%g"+. The \verb+%g+
represents the general-purpose floating point formatting specification
for the {\tt printf} function in C. Any valid floating-point
formatting specification, or \LaTeX\ command, is allowed in the
format.

A title for the plot and labels for the axes were set up in the next
three commands.  Note that they are processed by \LaTeX\ and so may
have math mode and other symbols in them. The ylabel may have multiple
lines, delineated with \verb+\\+.  The ylabel can be moved around with
optional offset parameters (see {\tt set ylabel} in the GNUPLOT
manual). Typically, the ylabel needs to be moved to the left to avoid
interfering with the left-hand side of the plot.  Once these labels
are set up, they will be used for all subsequent plot commands until
they are changed. These labels are also supported by the other
terminal types, but (of course) any \LaTeX\ code in the string will
not be interpreted. We have also defined the range of both $x$ (now
$[0,2\pi]$) and $y$ (here $[0,1]$).

So far we have plotted one curve, $y=\sin(x)$, on one plot. In
GNUPLOT, each {\tt plot} command generates a new plot. If the output
is to a screen, the screen is cleared. If to a printer, a new page is
produced. In the {\tt latex} case, a new picture is started. It is not
likely that \LaTeX\ users will want this to happen, so generally each
plot has its own input file and is kept in a separate output ({\tt
.tex}) file for inclusion at different places in the document.

\paragraph{Example 3:} To place more than one curve on a plot, use one
{\tt plot} statement and separate the description of each curve by a
comma. In our next example, we will plot both a function and a data
file on the same plot. This plot is shown in Figure~\ref{eg3}.

\singlespace
\begin{verbatim}
    set terminal latex
    set output "eg3.tex"
    set format xy "$%g$"
    set title "This is another plot"
    set xlabel "$x$ axis"
    set ylabel "$y$ axis"
    set key 15,-10
    plot x with lines, "eg3.dat" with linespoints
\end{verbatim}
\currentspace

\boxfigure{htbp}{\fullboxwidth}{
  \begin{center}
    \input{eg3}
  \end{center}
  \caption{An example with two curves on the same plot.}
  \label{eg3}
}

Here you will see that the $x$ range was not specified. The $x$ range
is determined automatically, unless specified by the user.  In
this case, it is defined by the range of the data file
\verb+"eg3.dat"+. The function is plotted over the same range. If no
data files or $x$ range are supplied, the default range of $[-10:10]$
is used. We have also moved the key to a different position.  The
function $y=x$ is plotted ``with lines'', which is the default plot
style for functions, and is shown here to illustrate the plot style
option.  The data file {\tt eg3.dat} is plotted with style {\tt
linespoints}, a style like {\tt lines} that also plots a symbol at
each data point.

There is a style called {\tt points} that only plots the symbols at
data points, and another called {\tt dots} that plots a tiny dot for
each data point.  The {\tt points} and {\tt linespoints} styles
produce a different point symbol for each curve on the plot (for up to
twelve symbols, after which they are re-used; see
Figure~\ref{linepoint} for a complete list). The {\tt lines} and {\tt
linespoints} styles use a different line style for each curve on the
plot (in this example the dots have different spacing). The
style {\tt impulses} draws a perpendicular from each point to the
$x$-axis. Finally, the {\tt errorbars} style can draw error bars at
each data point (see the GNUPLOT manual).

\paragraph{Example 4:} In the above plots of $\sin(x)$, it would make
more sense to label the axis in units of $\pi$. The position and
labels of the tic labels may be specified by the user, with the {\tt
set xtics} and {\tt set ytics} commands. This is demonstrated by
the following example, shown in Figure~\ref{eg4}.

\singlespace
\begin{verbatim}
    set terminal latex
    set output "eg4.tex"
    set format y "$%g$"
    set format x "$%.2f$"
    set title "This is $\sin(x)$"
    set xlabel "This is the $x$ axis"
    set ylabel "$\sin(x)$"
    set nokey
    set xtics -pi, pi/4
    plot [-pi:pi] [-1:1] sin(x)
\end{verbatim}
\currentspace

\boxfigure{htbp}{\fullboxwidth}{
  \begin{center}
    \input{eg4}
  \end{center}
  \caption{An example of the {\tt set xtics} command.}
  \label{eg4}
}

Since {\tt pi} is a predefined variable in GNUPLOT, we can use it
anywhere we may use an expression. The {\tt set xtics} command here
specifies that the tics on the $x$ axis start at $-\pi$ and increment
by $\pi/4$. Since no end point is given, the tics continue to the
right edge. We have also turned off the key, and changed the format to
restrict the $x$-axis tic labels to 2 decimal places.

With a little more work, the plot can look even better.  Another form
of this command allows us to specify the label and position of each
tic individually.  Replacing the above {\tt set xtics} command with
the following gives us Figure~\ref{eg5}. We also make use of the line
continuation character, the backslash (\verb+\+), to spread out this
command for readability.

\singlespace
\begin{verbatim}
    set xtics ("$-\pi$" -pi,\
     "$-\frac{\pi}{2}$" -pi/2,\
     "0" 0,\
     "$\frac{\pi}{2}$" pi/2,\
     "$\pi$" pi)
\end{verbatim}
\currentspace

\boxfigure{htbp}{\fullboxwidth}{
  \begin{center}
    \input{eg5}
  \end{center}
  \caption{A fancy example of the {\tt set xtics} command.}
  \label{eg5}
}

\paragraph{Going further:} You should now be able to make a variety of
plots for your \LaTeX\ document. We will present a final example
without explanation that showcases some of the capabilities of
GNUPLOT. You may find documentation for the various commands in the
GNUPLOT manual, though hopefully this example is somewhat
self-explanatory. This is shown in Figure~\ref{eg6}.

\singlespace
\begin{verbatim}
    set terminal latex
    set output "eg6.tex"
    set size 3.5/5, 3/3.
    set format y "$%g$"
    set format x "$%5.1f\mu$"
    set title "This is a title"
    set xlabel "This is the $x$ axis"
    set ylabel "This is\\a longer\\version\\ of\\the $y$\\ axis"
    set label "Data" at -5,-5 right
    set arrow from -5,-5 to -3.3,-6.7
    set key -4,8
    set xtic -10,5,10
    plot [-10:10] [-10:10] "eg3.dat" title "Data File"  with linespoints 1 7,\
       3*exp(-x*x)+1  title "$3e^{-x^{2}}+1$" with lines 4
\end{verbatim}
\currentspace

\boxfigure{htbp}{\fullboxwidth}{
  \begin{center}
    \input{eg6}
  \end{center}
  \caption{An example of many features.}
  \label{eg6}
}

\paragraph{Line and point types:} For reference, we show all of the
line and point types available in Figure~\ref{linepoint}.

\boxfigure{htbp}{\fullboxwidth}{
  \begin{center}
    \input{linepoin}
  \end{center}
  \caption{All of the line and point types in the \LaTeX\ driver.}
  \label{linepoint}
}

\subsection{Summary --- Use with \LaTeX}
In summary, to use the \LaTeX\ facilities of GNUPLOT, the first
command to GNUPLOT should be
\begin{syntax}
    set terminal latex
\end{syntax}
and the output of GNUPLOT should be directed to a file, for example,
\begin{verbatim}
    set output "plot.tex"
\end{verbatim}
This may be anything you like but it should have a {\tt .tex} extension,
of course. Then the size of the plot should be given. For example, the
command
\begin{verbatim}
    set size 1,2
\end{verbatim}
tells GNUPLOT to use a 5 inch wide by 6 inch high box for the plot.
The numbers given are {\em scale factors}, not the actual size.  The
default is 5 inches by 3 inches.  This is the size of the complete
plot, including all labels.

When finished, the file will contain all of the plots you have
specified (you probably only want one plot per file). This file can
then be used in a \LaTeX\ document, \eg,

\singlespace
\begin{verbatim}
    \begin {figure}
      \begin{center}
        \input{plot}
      \end{center}
    \end {figure}
\end{verbatim}
\currentspace
This puts the plot into a figure.

You will also want to read about the following commands: {\tt set
title, set xlabel, set ylabel, set key, set label, set xtics, set
ytics}, and {\tt set clip}.  These are all described in the regular
GNUPLOT manual.

\section{Use with EEPIC}
\label{s:eepic}
EEPIC is a macro package extending the picture environment of \LaTeX.
If you have the EPIC or EEPIC macros, and your {\tt dvi} translator
supports the {\em tpic\/} \verb+\special+s, then you can save \LaTeX\
memory.  With EEPIC pictures, the {\tt plot.tex} file will be smaller,
\LaTeX\ will run much faster (and need much less memory), and the {\tt
dvi} file will be smaller. The quality of the output is about the
same. If you change the source, you can generate some more interesting
line styles.

To use EEPIC, set GNUPLOT's terminal type to {\tt eepic} instead of
{\tt latex}, and use GNUPLOT as before. The line styles will change.
Include the file {\tt plot.tex} in your document as before, along with
the document style options {\tt [epic,eepic]}.

\section{For Former Gnu\TeX\ Users}
\label{oldusers}

Former Gnu\TeX\ users may be pleased with many of the new features
(many inspired by your suggestions!), but will also find many changes.
GNUPLOT will {\em not\/} run all Gnu\TeX\ input files unchanged.
Several Gnu\TeX\ features were not included in GNUPLOT because they
were specific to the \LaTeX\ driver. I encourage you to use the newer
GNUPLOT.  A translator is available that attempts to translate your
old Gnu\TeX\ 1.6 input files into GNUPLOT 3.0 files. You can ftp it
from \verb+cs.duke.edu+ as \verb+dist/sources/gnuplot/gnut2p.tar.Z+.
This file also contains directions and a list of changes from Gnu\TeX\
to GNUPLOT.

\section{Contact}
Please contact me at \verb+David.Kotz@Dartmouth.edu+ with any comments you may
have on GNUPLOT's \LaTeX\ driver. For general GNUPLOT questions, send
mail to the GNUPLOT mailing list
(\verb+pixar!info-gnuplot@ucbvax.berkeley.edu+).


\end{document}
